Longitude

Latitude

-100

-100

-100

-100

-200

-200

-200

-200

-2000

Newport

Coos Bay

Cape Blanco

30’ 126oW 30’ 125oW 30’ 124oW 30’

30’

42^oN

30’

43^oN

30’

44^oN

30’

45^oN