320 340 360 380

LongWave (W/m2)

NH0007: R/V New Horizon 27 July - 12 August 2000

200 400 600 800 1000

ShortWave (W/m2)

12 14 16 18

Rel. Humid. (%)

8 10 12 14

SST (deg C)

31 32 33 34

Salinity (psu)

216 216.1 216.2 216.3 216.4 216.5 216.6 216.7 216.8 216.9 217 0 2 4

Fluor. (volts)

Day of Year (GMT)