0 2 4 6

TrueWind Spd (m/s)

NH0007: R/V New Horizon 27 July - 12 August 2000

150 200 250 300

True Wind Dir

42

43

44

Latitude

-126

-125

-124

Longitude

1012

1014

1016

Atm Press (mb)

222 222.1 222.2 222.3 222.4 222.5 222.6 222.7 222.8 222.9 223 12 14 16

Air Temp (deg C)

Day of Year (GMT)