6 7 -100 -90 -80 -70 -60 -50 -40 -30 -20 -10

Temperature (degC)

Cast#

1 2 3 4 5 6 7 15 16 17 18

32.05 32.25

-100 -90 -80 -70 -60 -50 -40 -30 -20 -10 Salinity (psu)