5

7

9

11

13

15

-300

-250

-200

-150

-100

-50

0

5

5

6

6

6

7

7

8

9

9

10

10

11

11

12

13

14

CTD Stations

5 6 7 8 9 10 11 12 13

Temperature

32 32.5 33 33.5 34 34.5 35 35.5 36

0 10 20 30 40 50 60 70 80

-300

-250

-200

-150

-100

-50

0

Along Track Distance (km) Relative to 1st Station

Depth (m)

32.5

33

33

33

33.5

33.5

33.5

34

34

34.5

34.5

35

35

Salinity max=35.7