69 30’W 69 W 68 30’W 68 W

40 N

40 30’N

41 N

Longitude

Latitude

OC-296 CTD Stations

18 17 16 15

14 13

12 11 10 9 8

7 6 54 3 2

1

60m

80m

100m

200m