-9 -8.5 -8 -7.5 -7 -6.5 -6 -5.5 -5 -4.5 -4

117.2 117.4 117.6 117.8 118 118.2 118.4

5 10 15 20 25 30 35 40 Day of 1995 dbar

Log10 Turbulent Kinetic Energy Dissipation Shallow Site