0 50 100 150 200 250 300

Distance (km)

13.6 13.8 14.0 14.2 14.4 14.6 14.8 T (_o C)

200 100 60 40 T 0

200 100 60 40 P

0 50 100 150 200 250 300 350 400 450

Distance (km) 0 50 100 150 200 250 300

Distance (km)

200 100 60 40 Z 0