-50 -40 -30 -20 -10 0

4 6 8 10 temp depth

-50 -40 -30 -20 -10 0

32.5 33 33.5 salinity depth

-50 -40 -30 -20 -10 0

-10 -8 -6 -4 depth

LOG10(dissipation)

- eps -. chi -50 -40 -30 -20 -10 0

-8 -6 -4 -2 0 depth

LOG10(diffusivity)

- Krho -. Kt

G018020