6 7 8 9 10 11

0 20 40 60

Temperature / C

Pressure / dbars

32.3

32.4

32.5

32.6

32.7

0 20 40 60

Salinity / psu

Pressure / dbars

33 34 35 36

0 20 40 60

COND./(mS/cm)

Pressure / dbars

24.8 25 25.2

25.4

25.6

0 20 40 60

Sigma_theta / ( kg/m^3)

Pressure / dbars sj08d124