0 5 10

-100 -90 -80 -70 -60 -50 -40 -30 -20 -10 0

Temp in deg C

Depth in m

Temperature vs Depth

-120 -100 -80 -60 -40

-100 -90 -80 -70 -60 -50 -40 -30 -20 -10 0

Sv in dB

Depth in m

265 KHz - +

t4_76data binned (1m)

420 KHz - * 1100 KHz - o 3000 KHz - x