0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 -80

-70

-60

-50

-40

-30

-20

-10

0 log (BvN) vs Depth and Size - CTD Station 76

ESR in mm

Depth in m

2 1 0

0

0 0

2 0

1