# NAVIGATION FROM TT007NAV.___-___ ADCP:PINGDATA.089-.096
# the correct direction of motor rotiation is clockwise
# all times are given as local time (Z time -11 hrs)
breakout nom_depth depth pump_id holder_id sample_no l_filtered l_adsorbed ss_ku ss_alt1 ss_alt2 ss_whlr1 ss_whlr2 ss_org1-53 ss_org_gt53 filter_flowrate adsorber_flowrate gt53um_grey_od gt53um_red_od gt53um_green_od gt53um_blue_od blue/green_ratio 
1 53 53 JAN I 15 5513.0 3294.8 x nd nd nd nd x nd 0.4196 0.2507 0.0038 0.0015 0.0049 0.0077 1.5515 
2 77 77 APR* H 16 3845.7 3287.3 x nd nd nd nd x x 0.2927 0.2502 0.0265 0.0180 0.0281 0.0522 1.8610 
7 148 148 FEB G 17 9067.0 3202.1 x nd nd nd nd x nd 0.6900 0.2437 0.0086 0.0063 0.0094 0.0139 1.4743 
8 196 196 MAR F 18 10250.2 2916.3 x nd nd nd nd x x 0.7801 0.2219 0.0095 0.0070 0.0100 0.0145 1.4430 
9 294 294 MAY E 19 10523.1 2766.8 x nd nd nd nd x nd 0.8008 0.2106 0.0084 0.0062 0.0092 0.0125 1.3665 
10 393 393 JULY* D 20 9490.9 2719.5 x nd nd nd nd x x 0.7223 0.2070 0.0096 0.0073 0.0105 0.0138 1.3099 
11 490 490 AUG C 21 10593.5 2795.2 x nd nd nd nd x nd 0.8062 0.2127 0.0073 0.0060 0.0078 0.0105 1.3378 
12 587 588 nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd 
13 685 686 OCT B 22 10326.2 2867.1 x nd nd nd nd x x 0.7859 0.2182 0.0061 0.0051 0.0068 0.0086 1.2710 
14 782 783 nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd 
15 880 881 NOV A 23 10373.2 2797.1 x nd nd nd nd x nd 0.7894 0.2129 0.0048 0.0033 0.0056 0.0070 1.2543 
T/STD 925 926 nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd 
