# NAVIGATION DATA LOST: NO ADCP DATA EITHER. positions are best guess
# nominal depths are corrected using data from pump April and end of wire STD.
# (B) Bidigare sampled 1-53 from 46 using smaller large punch
breakout nom_depth depth pump_id holder_id sample_no l_filtered l_adsorbed ss_ku ss_alt1 ss_alt2 ss_whlr1 ss_whlr2 ss_org1-53 ss_org_gt53 filter_flowrate adsorber_flowrate gt53um_grey_od gt53um_red_od gt53um_green_od gt53um_blue_od blue/green_ratio 
1 20 20 JUL F 50 5480.5 3105.9 x nd nd nd nd x x 0.320 0.182 0.0165 0.0113 0.0167 0.0323 1.9376 
2 44 43 MAY B 46 6096.0 3060.5 x 14 15 1.7 1.7 xB nd 0.356 0.179 0.0160 0.0112 0.0162 0.0300 1.8569 
7 115 113 FEB C 47 9877.6 2999.9 x nd nd nd nd x x 0.578 0.175 0.0157 0.0127 0.0157 0.0265 1.6936 
8 163 160 MAR D 48 11595.8 2990.5 x 22 nd 1.11 1.11 x nd 0.678 0.175 0.0141 0.0117 0.0141 0.0224 1.5903 
9 261 257 APR* E 49 12391.5 2920.4 x 16 17 1.8 1.8 x x 0.725 0.171 0.0143 0.0125 0.0142 0.0213 1.5006 
10 360 354 JAN A 45 12955.5 2805.0 x nd nd nd nd x nd 0.758 0.164 0.0120 0.0096 0.0124 0.0178 1.4384 
11 457 450 AUG G 51 13370.0 2725.5 x 18 19 1.9 1.9 x x 0.782 0.159 0.0088 0.0075 0.0088 0.0124 1.4066 
12 554 545 nd nd nd nd nd x nd nd nd nd nd nd nd nd nd nd nd nd nd 
13 652 642 OCT H 52 13327.6 2835.3 x nd nd nd nd x nd 0.779 0.166 0.0056 0.0046 0.0056 0.0079 1.4144 
14 749 737 nd nd nd nd nd x nd nd nd nd nd nd nd nd nd nd nd nd nd 
15 847 834 NOV I 53 14168.8 2524.9 x 20 21 '1.10 '1.10 x x 0.829 0.148 0.0043 0.0033 0.0044 0.0066 1.4857 
T/STD 892 878 nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd 
