# NAVIGATION FROM: TT007NAV.152-157 ADCP:PINGDATA.342-349
# Delayed start 1:00 hrs due to respooling cable to 400m and back.
# Bidigare got a subsample of 74 largest punch
# Bidigare got 1/4 of  >53 E074
# Forgot to add MeOH to Wheeler holders. Samples?
# nominal depths are corrected using data from pump April and end of wire STD.
# all times are given as local time (Z time -10 hrs)
breakout nom_depth depth pump_id holder_id sample_no l_filtered l_adsorbed ss_ku ss_alt1 ss_alt2 ss_whlr1 ss_whlr2 ss_org1-53 ss_org_gt53 filter_flowrate adsorber_flowrate gt53um_grey_od gt53um_red_od gt53um_green_od gt53um_blue_od blue/green_ratio 
1 25 25 JAN A 73 6266.0 624.6 x nd nd nd nd nd nd 0.347 0.035 0.0178 0.0118 0.0180 0.0375 1.9376 
2 49 48 MAY B 74 6638.8 783.6 x w41 42 '2.11 '2.11 B B 0.368 0.043 0.0197 0.0146 0.0198 0.0385 1.8569 
7 120 119 FEB C 75 10298.9 620.8 x nd nd nd nd nd nd 0.570 0.034 0.0086 0.0062 0.0088 0.0144 1.6936 
8 168 166 MAR D 76 12831.0 885.8 x nd nd 3.3 3.3 nd nd 0.710 0.049 0.0093 0.0077 0.0093 0.0146 1.5903 
9 266 263 JUL E 77 12574.7 844.1 x nd nd nd nd nd nd 0.696 0.047 0.0122 0.0106 0.0120 0.0183 1.5006 
10 365 361 AUG F 79 13933.5 938.8 x w45 46 '2.12 '2.12 nd nd 0.772 0.052 0.0109 0.0097 0.0107 0.0159 1.4384 
11 462 457 OCT G 80 14606.7 548.9 x nd nd nd nd nd nd 0.809 0.030 0.0078 0.0067 0.0078 0.0114 1.4066 
12 559 553 nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd 
13 657 650 APR* H 81 14981.9 571.6 x w43 44 3.1 3.1 nd nd 0.830 0.032 0.0054 0.0041 0.0055 0.0081 1.4144 
14 754 746 nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd 
15 852 843 NOV I 82 15282.0 389.9 x w47 48 3.2 3.2 nd nd 0.846 0.022 0.0058 0.0046 0.0059 0.0087 1.4857 
T/STD 897 887 nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd nd 
