3400

3600

3600

3700

3700

3700

3100 3300 3500 3700 3900 4100

Depth (m)

NBP0104 SeaBeam Edited Data - Day 206

292˚ 40'

292˚ 40'

292˚ 50'

292˚ 50'

293˚ 00'

293˚ 00'

293˚ 10'

293˚ 10'

-60˚ 10' -60˚ 10'

-60˚ 05' -60˚ 05'

-60˚ 00' -60˚ 00'

-59˚ 55' -59˚ 55'

-59˚ 50' -59˚ 50'

-59˚ 45' -59˚ 45'

-59˚ 40' -59˚ 40'

-59˚ 35' -59˚ 35'

-59˚ 30' -59˚ 30'

-59˚ 25' -59˚ 25'

-59˚ 20' -59˚ 20'

Jul25 04:09

Jul25 05:00

06:00

07:00

08:00

09:00

GMT Jul 27 21:36:57 2001 K. Gavahan, RPSC

Gridded Data Day 206 0409-0909 Contour Interval=50m Grid Cell Size=250m X 250m 143 X 420 Matrix