3700

2700 3000 3300 3600 3900 4200

Depth (m)

NBP0104 SeaBeam Edited Data - Day 207

291˚ 10'

291˚ 10'

291˚ 20'

291˚ 20'

291˚ 30'

291˚ 30'

-63˚ 15' -63˚ 15'

-63˚ 10' -63˚ 10'

-63˚ 05' -63˚ 05'

-63˚ 00' -63˚ 00'

-62˚ 55' -62˚ 55'

-62˚ 50' -62˚ 50'

-62˚ 45' -62˚ 45'

-62˚ 40' -62˚ 40'

-62˚ 35' -62˚ 35'

-62˚ 30' -62˚ 30'

Jul26 00:00

Jul26 01:00

02:00

03:00 04:00

05:00

GMT Aug 7 21:14:41 2001 K. Gavahan, RPSC

Gridded Data Day 207 0000-0500 Contour Interval=50m Grid Cell Size=150m X 150m 172 X 628 Matrix