2950 3050 3150 3250 3350 3450

Depth (m)

NBP0104 SeaBeam Edited Data - Day 207

290˚ 50'

290˚ 50'

291˚ 00'

291˚ 00'

-64˚ 25' -64˚ 25'

-64˚ 20' -64˚ 20'

-64˚ 15' -64˚ 15'

-64˚ 10' -64˚ 10'

-64˚ 05' -64˚ 05'

-64˚ 00' -64˚ 00'

-63˚ 55' -63˚ 55'

-63˚ 50' -63˚ 50'

Jul26 10:00

11:00

12:00

13:00

14:00

15:00

GMT Aug 7 21:38:53 2001 K. Gavahan, RPSC

Gridded Data Day 207 1000-1500 Contour Interval=50m Grid Cell Size=150m X 150m 123 X 492 Matrix