2700

2537.5 2712.5 2887.5 3062.5 3237.5 3412.5

Depth (m)

NBP0104 SeaBeam Edited Data - Day 207

290˚ 30'

290˚ 30'

290˚ 40'

290˚ 40'

290˚ 50'

290˚ 50'

-64˚ 50' -64˚ 50'

-64˚ 45' -64˚ 45'

-64˚ 40' -64˚ 40'

-64˚ 35' -64˚ 35'

-64˚ 30' -64˚ 30'

-64˚ 25' -64˚ 25'

Jul26 15:00

16:00

17:00

18:00

19:00

20:00

21:00

22:00

23:00

GMT Aug 7 21:29:14 2001 K. Gavahan, RPSC

Gridded Data Day 207 1500-2400 Contour Interval=25m Grid Cell Size=150m X 150m 131 X 343 Matrix