2537.5 2712.5 2887.5 3062.5 3237.5 3412.5

Depth (m)

NBP0104 SeaBeam Edited Data - Day 208

69˚ 50'W

69˚ 50'W

69˚ 40'W

69˚ 40'W

69˚ 30'W

69˚ 30'W

65˚ 10'S 65˚ 10'S

65˚ 05'S 65˚ 05'S

65˚ 00'S 65˚ 00'S

64˚ 55'S 64˚ 55'S

64˚ 50'S 64˚ 50'S

64˚ 45'S 64˚ 45'S

Jul27 00:00

Jul27 01:00

02:00

03:00

04:00

05:00

GMT Aug 4 21:32:29 2001 K. Gavahan, RPSC

Gridded Data Day 208 0000-0500 Contour Interval=50m Grid Cell Size=150m X 150m 194 X 399 Matrix