2625 2775 2925 3075 3225 3375

Depth (m)

NBP0104 SeaBeam Edited Data - Day 208

70˚ 40'W

70˚ 40'W

70˚ 30'W

70˚ 30'W

70˚ 20'W

70˚ 20'W

70˚ 10'W

70˚ 10'W

70˚ 00'W

70˚ 00'W

69˚ 50'W

69˚ 50'W

65˚ 40'S 65˚ 40'S

65˚ 35'S 65˚ 35'S

65˚ 30'S 65˚ 30'S

65˚ 25'S 65˚ 25'S

65˚ 20'S 65˚ 20'S

65˚ 15'S 65˚ 15'S

65˚ 10'S 65˚ 10'S

Jul27 05:00

06:00

07:00

08:00

09:00

10:00

11:00

12:00

13:00

14:00

GMT Aug 4 22:26:29 2001 K. Gavahan, RPSC

Gridded Data Day 208 0500-1004 Contour Interval=50m Grid Cell Size=150m X 150m 298 X 386 Matrix