300 900 1500 2100 2700 3300

Depth (m)

NBP0104 SeaBeam Edited Data - Day 208

70˚ 40'W

70˚ 40'W

70˚ 30'W

70˚ 30'W

70˚ 20'W

70˚ 20'W

70˚ 10'W

70˚ 10'W

70˚ 00'W

70˚ 00'W

65˚ 55'S 65˚ 55'S

65˚ 50'S 65˚ 50'S

65˚ 45'S 65˚ 45'S

65˚ 40'S 65˚ 40'S

65˚ 35'S 65˚ 35'S

Jul27 09:00

10:00

11:00

12:00

13:00

14:00 15:00

16:00

17:00

18:00

19:00

GMT Aug 4 22:29:00 2001 K. Gavahan, RPSC

Gridded Data Day 208 1208-1938 Contour Interval=100m Grid Cell Size=150m X 150m 246 X 299 Matrix