300.0 312.5 325.0 337.5 350.0 362.5

Depth (m)

NBP0104 SeaBeam Edited Data - Day 209

290˚ 40'

290˚ 40'

290˚ 50'

290˚ 50'

-66˚ 10' -66˚ 10'

-66˚ 05' -66˚ 05'

Jul28 00:00

Jul28 01:00

02:00

03:00

04:00

05:00

06:00

07:00

08:00

09:00

10:00

11:00

12:00

GMT Aug 4 20:09:24 2001 K. Gavahan, RPSC

Gridded Data Day 209 0000-0359 Contour Interval=5m Grid Cell Size=50m X 50m 378 X 467 Matrix